         180           8
   14.1901370125228        13.6096119390490        13.0234024803948     
   12.4371839083405        11.8291878412740        11.2195463650278     
   10.6263611520115        10.0989552399625     
 -0.207861021076927       2.334407952623109E-002  0.203114151322116     
  0.378786006773723       0.541772814501529       0.687769941864928     
  0.809518696166231       0.925617803135640     
 -2.757697326459165E-003  0.000000000000000E+000
   1.00190600663672       0.000000000000000E+000
  0.998782445531047       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
