         180           8
   14.1531627466984        13.6341444061490        13.0059893127282     
   12.3926991810809        11.7922414130825        11.1879764771927     
   10.5896232716554        10.0384811900164     
 -6.583239178705676E-002  0.107760554235384       0.130495988715214     
  0.259845776892661       0.479281377889029       0.627535422742009     
  0.714621241089304       0.760133052350817     
 -2.750271654880847E-003  0.000000000000000E+000
   1.00193669556977       0.000000000000000E+000
  0.998803899833994       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
