         180           8
   3.15392407205488        2.99899471522592        2.73323420644926     
   2.52147268128457        2.31587215095439        2.14429584336256     
   2.00806892045447        1.88524844935214     
  -34.4568405745286       -34.6760343432151       -34.9529845945937     
  -35.2245724047758       -35.4147332295049       -35.5783269294120     
  -35.7445219356374       -35.9828594092503     
 -4.114600823275860E-003  0.000000000000000E+000
  0.993247784900342       0.000000000000000E+000
  0.996298926440588       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
