         180           8
   6.60689533156454        6.48463668309456        6.34699433913115     
   6.22269034414400        6.09884372508368        6.02093053866082     
   5.89560644140883        5.83431186061400     
  -35.0206455473704       -34.7314436952750       -34.4262447834809     
  -34.0680040417424       -33.6739515063325       -33.1854686335456     
  -32.8168551695378       -32.4041607298214     
 -3.402212647226613E-003  0.000000000000000E+000
  0.992568370939309       0.000000000000000E+000
  0.995387192139611       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
