         180           8
   6.37959875448600        6.19685276084297        6.04002352635577     
   5.94458121812732        5.82271772904503        5.66900472684414     
   5.59642189456409        5.51005827121835     
  -35.1661748687213       -34.9502002465415       -34.6699252754601     
  -34.3087092004908       -33.8783427368955       -33.4643757586146     
  -33.0949597458823       -32.6277522866288     
 -3.631872911588688E-003  0.000000000000000E+000
  0.992400757990481       0.000000000000000E+000
  0.995675357968089       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
