         180           8
   1.76893613058149        1.39811779278918        1.15477115348333     
  0.956576128506144       0.814731235184444       0.707309773696258     
  0.614599811643411       0.515914347406007     
  -34.9061819838838       -35.0496605953623       -35.1230869036160     
  -35.2564741109849       -35.4031603121985       -35.4928807965248     
  -35.5912757835768       -35.6967317527783     
 -3.826760166957098E-003  0.000000000000000E+000
  0.992252629102802       0.000000000000000E+000
  0.995410635090261       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
