         180           8
   4.01172686336626        3.68905493684086        3.40431028132766     
   3.12769925443262        2.89010369665015        2.72461187174020     
   2.62006933858284        2.43606689729273     
  -34.8490723024243       -35.0064667800661       -35.2887839676681     
  -35.6163502388584       -35.9732615033126       -36.2182600980808     
  -36.7009788130923       -37.9324792497186     
 -3.724244523720223E-003  0.000000000000000E+000
  0.992471114483879       0.000000000000000E+000
  0.995652305168333       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
