         180           3
   14.2797197932421        12.2493052671104        10.0891176807390     
  0.189978365725923       0.734017190273658        1.08587255861540     
 -2.800156842289177E-003  0.000000000000000E+000
   1.00191572841561       0.000000000000000E+000
  0.998587924353279       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
