         180           8
   9.49246531313607        8.91973851469077        8.30485142568208     
   7.71686425434295        7.09722343414820        6.49206761034918     
   5.93465133007176        5.38796167888483     
  -30.7865029557535       -30.8437472125138       -30.9342839750217     
  -31.0923077111255       -31.2951444702153       -31.5452478222166     
  -31.8492253275494       -32.0769634454461     
 -3.917108865451566E-003  0.000000000000000E+000
  0.993013437488419       0.000000000000000E+000
  0.995845805818826       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
