         180           8
   9.61808235105017        8.98437461946978        8.34555750512225     
   7.71974822937192        7.12529790253333        6.55557504561438     
   5.98320452683456        5.42226505912268     
  -30.8932609916641       -30.9498847977506       -31.0887194865493     
  -31.2346050941957       -31.3584734847353       -31.5829389247575     
  -31.8566367771786       -32.1581258056756     
 -3.967373619435938E-003  0.000000000000000E+000
  0.992826453948481       0.000000000000000E+000
  0.995939551460134       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
