         180           8
   9.73080098167723        9.09906201335836        8.45041171987157     
   7.83919181714797        7.22264518071621        6.64999052116061     
   6.04594163497084        5.48124025341940     
  -31.0142928493770       -31.1010808861506       -31.1531561252471     
  -31.2367031174399       -31.4519973737533       -31.7551210746562     
  -32.0607019040713       -32.3131719948034     
 -3.980086065079497E-003  0.000000000000000E+000
  0.992876238256715       0.000000000000000E+000
  0.996155196204988       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
