         180           8
   10.2359569381990        9.60069851477170        8.96697081148172     
   8.31952400630962        7.76393602242227        7.25961256912059     
   6.62636053167944        6.17942413111679     
  -30.9504912138463       -31.0453829116127       -31.1287709831126     
  -31.3137022570302       -31.3950639724542       -31.0858733693209     
  -30.7122838564318       -30.4906965826103     
 -4.105495980223455E-003  0.000000000000000E+000
  0.993358291551201       0.000000000000000E+000
  0.996341951750985       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
