         180           8
   10.7038475850492        10.0734491253536        9.43227516739070     
   8.81110857987334        8.20509399400625        7.60953169076185     
   7.02519158827209        6.46837579171037     
  -31.7100868805332       -31.7297279022939       -31.7257427569021     
  -31.8099354714337       -31.9460216281979       -32.0884526259425     
  -32.2756782390352       -32.5610866795513     
 -4.323329898996652E-003  0.000000000000000E+000
  0.993802784616403       0.000000000000000E+000
  0.997101935630625       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
