         180           8
   7.77009988836719        7.59161951832650        7.44448682982515     
   7.31578723314873        7.15387014651061        6.99261334495324     
   6.87430546579262        6.80190884500694     
  -34.8665849743376       -34.7021333026422       -34.4041679538666     
  -34.0748111389559       -33.6857571558468       -33.2974362453732     
  -32.9733243736078       -32.5743198369981     
 -3.927089153853491E-003  0.000000000000000E+000
  0.992971761944082       0.000000000000000E+000
  0.996395083057953       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
