         180           8
   7.53678284774997        7.41782738261770        7.26327939495784     
   7.14321280724432        7.01093977262208        6.85909820598512     
   6.74082292728386        6.61200683662225     
  -34.9108883961774       -34.6845131823783       -34.3534189795864     
  -34.0091207203679       -33.6422424397021       -33.2707855263576     
  -32.9134393184710       -32.5752875968931     
 -3.950840103692808E-003  0.000000000000000E+000
  0.993156041982373       0.000000000000000E+000
  0.996415238268348       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
