         180           8
   7.70992784276403        7.56634487737244        7.42357227037924     
   7.27571255273704        7.13729686918232        6.98768094299821     
   6.85210758736421        6.70618932764579     
  -35.1948837070922       -34.9815333392035       -34.6758577486054     
  -34.3336254832746       -33.9552314801997       -33.5488195629930     
  -33.1836699344927       -32.7942818175727     
 -3.989544581944998E-003  0.000000000000000E+000
  0.993045082241305       0.000000000000000E+000
  0.996599873708008       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
