         180           3
   6.49358812016264        8.16871911940420        10.0734304444977     
 -0.769658401275095      -0.266584414495879       0.283000481725355     
 -2.760098414225972E-003  0.000000000000000E+000
   1.00186267711607       0.000000000000000E+000
  0.998908488014782       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
