         180           8
   7.39997751002869        7.25398689978669        7.12530142799658     
   6.98190054898337        6.84330123201069        6.71427114245803     
   6.56637706108615        6.44991023654299     
  -34.9901335751069       -34.8062651773678       -34.5016450489470     
  -34.1604429843446       -33.8121662054092       -33.4254977153306     
  -33.0820323683196       -32.6560165137615     
 -4.094212865937802E-003  0.000000000000000E+000
  0.993429734642056       0.000000000000000E+000
  0.996641385042442       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
