         180           8
   9.62299544613169        9.01970495719343        8.37495654088190     
   7.75895219492809        7.13724038595274        6.52014115304613     
   5.97313843485277        5.43255108462901     
  -29.5989579604084       -29.7142723169186       -29.8173465211222     
  -29.9402010638260       -30.0892740928084       -30.2871601371645     
  -30.5469745548204       -30.8008445177991     
 -3.768025857589121E-003  0.000000000000000E+000
  0.992346212072219       0.000000000000000E+000
  0.995606362589144       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
