         180           3
   14.2620070100608        12.2275097127430        10.2103417122094     
  0.297688394519132       0.808042482980626        1.37008075090301     
 -2.698169654684791E-003  0.000000000000000E+000
   1.00183750632202       0.000000000000000E+000
  0.998943976331999       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
