         180           8
   9.58087030844793        8.91520534656734        8.29681336685602     
   7.66886320817371        7.03678657268097        6.44275007678700     
   5.90381531471751        5.41411655791863     
  -29.6012589477869       -29.6840415053580       -29.7894260269943     
  -29.9221674786848       -30.1286445008570       -30.4180232571403     
  -30.6755689851793       -30.7985328546831     
 -3.788452990085102E-003  0.000000000000000E+000
  0.992835777651470       0.000000000000000E+000
  0.995948010402543       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
