         180           3
   14.2842669682265        12.2044408646774        10.2009188703927     
   1.21334356754231        1.69572867097258        2.41097741851793     
 -2.735463740079552E-003  0.000000000000000E+000
   1.00192810961518       0.000000000000000E+000
  0.998927513740397       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
