         180           8
   9.39205535193278        8.67235147897986        8.05208695665376     
   7.40620014404357        6.77723560623855        6.19525490910208     
   5.62722293881471        5.12263364137129     
  -28.8159846318882       -28.9702672529483       -29.0615393810835     
  -29.2274624977226       -29.4424028496475       -29.6531730108122     
  -29.8259713633160       -30.0806824057225     
 -3.718488394265120E-003  0.000000000000000E+000
  0.992840734973442       0.000000000000000E+000
  0.996016425634737       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
