         180           8
   9.29850839829864        8.71789546944916        8.05346419164131     
   7.37780105771420        6.81164366820961        6.24368172172799     
   5.64010002165058        5.11639343775427     
  -28.9183865176307       -28.9449400637730       -29.0645358980360     
  -29.2335474677543       -29.4377914975802       -29.6425133990514     
  -29.8786608120229       -30.1284056977300     
 -3.772205601346039E-003  0.000000000000000E+000
  0.992994063633143       0.000000000000000E+000
  0.996239519136055       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
