         180           8
   9.37757804616857        8.67693529300733        8.03075535548211     
   7.39514206466623        6.75356346197512        6.17780170340093     
   5.63963416336476        5.11957117310914     
  -28.8544850118321       -29.0112891039785       -29.1578773512621     
  -29.3354440454680       -29.5506645689474       -29.7681994613447     
  -30.0091607327414       -30.2289651556176     
 -3.843658840522191E-003  0.000000000000000E+000
  0.993247511963413       0.000000000000000E+000
  0.996281054543063       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
