         180           8
   9.08806783597113        8.44780989694450        7.84204118525449     
   7.18610164130189        6.56760859038818        5.98896664921752     
   5.40513046685885        4.84838669524816     
  -28.0760093632322       -28.1292020183226       -28.1846767329836     
  -28.3280558934219       -28.5694873381747       -28.8083575729126     
  -29.0953730925230       -29.3780781046106     
 -3.659999912690798E-003  0.000000000000000E+000
  0.992801150462360       0.000000000000000E+000
  0.995590224353765       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
