         180           8
   9.20542316080725        8.47240168923241        7.84707250614181     
   7.24785993549116        6.67872979611619        6.04283056644173     
   5.43023027514054        4.92766226702756     
  -28.3004284345645       -28.3923771764657       -28.4739778574337     
  -28.6070457648061       -28.7849347145766       -29.0173034111562     
  -29.2847597623906       -29.5531359223609     
 -3.619932517199044E-003  0.000000000000000E+000
  0.993001672500211       0.000000000000000E+000
  0.995783213810395       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
