         180           8
   9.39620325103930        8.63787562613444        7.96684364049740     
   7.35358468303733        6.71106294895149        6.05884738199519     
   5.45991662957010        4.96868469593301     
  -25.4995466621406       -26.8706368425675       -27.5708994903906     
  -27.9725107126701       -28.4726341365750       -28.9350362520291     
  -29.2660121752930       -29.5521594334793     
 -3.863679002354747E-003  0.000000000000000E+000
  0.993301161795617       0.000000000000000E+000
  0.996419611462619       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
