         180           8
   14.6564547693192        14.1143143584315        13.5400493968373     
   12.9017019973102        12.3024261353820        11.7251862997187     
   11.1035875793445        10.5567008781124     
   1.97098047987598        2.12563170145218        2.21405444328989     
   2.27443686028841        2.44954473489341        2.65357705264563     
   2.77065277258790        2.84022366743716     
 -2.720169021790776E-003  0.000000000000000E+000
   1.00181271035151       0.000000000000000E+000
  0.998869407667886       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
