         180           8
   9.12407146995345        8.45467506177567        7.80445291145380     
   7.18034970624762        6.58403897191891        6.02957195989331     
   5.46337010521176        4.88750710139026     
  -28.1932650516194       -28.2099890221726       -28.3391147485658     
  -28.5399241704550       -28.7341082882358       -28.9093038200548     
  -29.1663553053353       -29.4255345061585     
 -3.605000136738746E-003  0.000000000000000E+000
  0.992435415530262       0.000000000000000E+000
  0.995599658296296       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
