         180           8
   14.6663337441494        14.0720225611616        13.5032739204060     
   12.8868168043660        12.2761809536718        11.6408034045790     
   11.0096056845530        10.4785568026768     
   2.10501627369140        2.21642235054626        2.40940444236998     
   2.53624966471629        2.67932983142285        2.83552979187657     
   2.92296577211207        3.00602101057123     
 -2.779948425899022E-003  0.000000000000000E+000
   1.00198886516158       0.000000000000000E+000
  0.998760818888541       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
