         180           8
   9.06079349896437        8.43863066285268        7.82435393091038     
   7.17992987071858        6.57141514624908        5.98727643241137     
   5.40314379502931        4.84674815832403     
  -28.0761215133124       -28.1247181816493       -28.1807414666563     
  -28.3198587052240       -28.5605704960684       -28.8029592404975     
  -29.0871550584348       -29.3833064156187     
 -3.658192241448709E-003  0.000000000000000E+000
  0.992780508661272       0.000000000000000E+000
  0.995548574196571       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
