         180           8
   9.26718958335974        8.52093483967291        7.89645730695236     
   7.29178280186173        6.70700395628966        6.08586451327903     
   5.51534830717109        4.95597074015894     
  -28.3022396435021       -28.3962999132377       -28.4688376268828     
  -28.6028363001125       -28.7820526143297       -29.0226716538118     
  -29.3062580338165       -29.5686658090741     
 -3.721373690537112E-003  0.000000000000000E+000
  0.992685040256267       0.000000000000000E+000
  0.995990911787796       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
