         180           8
   14.0322285906421        13.4627316256626        12.9476693911682     
   12.4147946114838        11.8279614587861        11.2235943474074     
   10.6544271454137        10.1491937983080     
   4.76199096640827        3.51392599524236        3.01290378353733     
   2.93092366153793        2.78478118688599        2.66494932589084     
   2.69542360090370        2.80409921113741     
 -2.775007477168985E-003  0.000000000000000E+000
   1.00214054521582       0.000000000000000E+000
  0.999303626508035       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
