         180           8
   8.90063245180707        8.25413531589828        7.60628875199363     
   6.99726141336847        6.40489172290205        5.86016071588452     
   5.29718885162311        4.85453701966710     
  -28.3140552726651       -28.3940152154665       -28.5457146574700     
  -28.6196581672230       -28.7837813315609       -29.0685392494583     
  -29.2776897661810       -29.5428318505758     
 -3.520511676833126E-003  0.000000000000000E+000
  0.992732555546582       0.000000000000000E+000
  0.995854448644674       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
