         180           8
   5.65720116877987        5.48938182945473        5.34273809882668     
   5.21985054518453        5.07343215168799        4.93287601011916     
   4.85124010205233        4.74166953238701     
  -30.4087301457167       -30.3707548048974       -30.3950331873094     
  -30.2745090113021       -29.8944201279464       -29.5231987901166     
  -29.1784411476320       -28.8122022045485     
 -2.980133651352987E-003  0.000000000000000E+000
  0.991646890577495       0.000000000000000E+000
  0.994703084945808       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
