         180           8
   5.68998896759069        5.57404067348905        5.46040420298815     
   5.32058738293727        5.18216112056865        5.07962584076240     
   4.95994844863596        4.83475722532004     
  -31.8108589933571       -31.7241877069982       -31.4129624715998     
  -31.0736696729977       -30.6685239797358       -30.2627143522301     
  -29.8566869200505       -29.5041235630044     
 -3.103427341299283E-003  0.000000000000000E+000
  0.991957297937381       0.000000000000000E+000
  0.994994130797066       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
