         180           8
   5.77284203859299        5.59693072707434        5.45828632145341     
   5.34752553535798        5.21157287429040        5.06663466911621     
   4.88215056441489        4.88092102969462     
  -32.3632198905703       -32.0801626463186       -31.7563615923613     
  -31.4186346380521       -31.0360789531295       -30.6448767066818     
  -30.2466827539450       -29.8623517321657     
 -3.355595541023452E-003  0.000000000000000E+000
  0.992416145355661       0.000000000000000E+000
  0.995384274116499       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
