         180           8
   7.14394001632525        6.50052773472555        5.83431099394336     
   5.22415765895298        4.64011624939943        4.08812051678743     
   3.58281403655234        2.95786295883322     
  -28.8851523109423       -28.9908077573298       -29.0986024750881     
  -29.2367742618821       -29.4240145779720       -29.6601961786671     
  -29.9313832991295       -30.0055159440407     
 -3.271869582880339E-003  0.000000000000000E+000
  0.992677464958191       0.000000000000000E+000
  0.995254023688955       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
