         180           8
   7.26232128931098        6.54901128254551        5.77363818731965     
   5.11147404238126        4.54394331052529        3.97193316785204     
   3.41713178130496        2.90255127114835     
  -29.2501268938171       -29.3656312043709       -29.4898024064010     
  -29.6591220027200       -29.4673379142693       -28.9090195375698     
  -28.5496544705411       -28.2869996675908     
 -3.177756489456439E-003  0.000000000000000E+000
  0.992348777960865       0.000000000000000E+000
  0.995087355921286       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
