         180           8
   5.65239099803913        5.05874021705228        4.46263183079251     
   3.91059348494085        3.39010398958195        2.86077210569558     
   2.44261302488497        2.09656186931272     
  -28.5279205510631       -28.3733345362131       -28.4432649971007     
  -28.5849753654176       -28.8278545571525       -29.0140294664307     
  -29.1610745824380       -29.5698041218432     
 -2.754719234305140E-003  0.000000000000000E+000
  0.991621351345931       0.000000000000000E+000
  0.994665728737116       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
