         180           8
   3.04244489516782        2.88820207116176        2.78214127657645     
   2.71942329118007        2.65639391181948        2.52130587539814     
   2.39018808517010        2.22340528897317     
  -33.9502000641313       -33.7485500887958       -33.4250138895892     
  -33.1316256872740       -32.7374457755786       -32.3525982650747     
  -31.9902105029356       -31.6878282942561     
 -3.129545153071873E-003  0.000000000000000E+000
  0.992384138628699       0.000000000000000E+000
  0.995137709818946       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
