         180           3
   6.48651421288975        8.10216526063036        9.99871505876589     
 -0.200024725750082       0.415615297005705        1.05424740904661     
 -2.656567139926663E-003  0.000000000000000E+000
   1.00145350149850       0.000000000000000E+000
  0.998427193164538       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
