         180           8
   4.98439602814723        4.75341443639761        4.53919488413814     
   4.30971856197174        4.15494770567611        4.02292640058097     
   3.92252098443975        3.87991748200360     
  -34.3647856012715       -34.1615006051325       -33.9164903121493     
  -33.6416189436844       -33.3103314591305       -32.9617196884393     
  -32.6114423023754       -32.2503725373774     
 -3.316401307374965E-003  0.000000000000000E+000
  0.992454536296046       0.000000000000000E+000
  0.995639042492425       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
