         180           8
   4.85483251510443        4.68250308363074        4.55452741320264     
   4.47595776332081        4.37552868211542        4.30811430869334     
   4.15854805418750        4.13903226119925     
  -34.7158787777960       -34.4746213857621       -34.1629814412959     
  -33.7920648337860       -33.4202529751933       -33.0674881745042     
  -32.6775715090943       -32.4010943684456     
 -3.393191798206462E-003  0.000000000000000E+000
  0.992495488139320       0.000000000000000E+000
  0.995731599133431       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
