         180           8
   4.81870152643894        4.67763007867973        4.52366451788579     
   4.40030348292812        4.28291733550806        4.20355420967960     
   4.12842928284882        4.04475063147377     
  -34.5650153594800       -34.4397170419167       -34.1571197059634     
  -33.8754174245022       -33.6063447707727       -33.3378181394091     
  -33.0151559298293       -32.5841015149898     
 -3.424432698735857E-003  0.000000000000000E+000
  0.992524326350135       0.000000000000000E+000
  0.995807573680344       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
