         180           8
   4.75229039955051        4.53336857640852        4.40492004911695     
   4.27556964660718        4.16983901226759        4.07595389151273     
   4.00426304099183        4.00414804482764     
  -34.6663737648161       -34.4252981362854       -34.1635635853313     
  -33.8223661966120       -33.4678080460098       -33.1412635766766     
  -32.7751954442423       -32.3342971376699     
 -3.481069158039797E-003  0.000000000000000E+000
  0.992612514273320       0.000000000000000E+000
  0.995821408257868       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
