         180           8
   5.09864579148837        4.98986457279129        4.87600982900198     
   4.74841919410019        4.61281508594805        4.50974148583494     
   4.40473262734614        4.27080104017918     
  -32.5923770446322       -32.0672197631356       -31.4012496689722     
  -30.6941002138934       -29.9318997987661       -29.1460869795934     
  -28.4276345086770       -27.7496060854044     
 -3.410404206635282E-003  0.000000000000000E+000
  0.992542522196607       0.000000000000000E+000
  0.995921626631420       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
