         180           8
   4.88026490258712        4.70305508694145        4.61284049836759     
   4.49148146179564        4.36439976985060        4.28264206396633     
   4.24214197591303        4.19028815202978     
  -33.9372342881376       -33.7080651897207       -33.3941405410183     
  -33.0911331966754       -32.7363917930121       -32.3524984952522     
  -32.0741185100184       -31.2715561653975     
 -3.484994242475588E-003  0.000000000000000E+000
  0.992549178110336       0.000000000000000E+000
  0.995896068103768       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
