         180           8
   8.44591735564249        8.32846736800353        8.14021656693503     
   7.99042181560259        7.78971160298443        7.66458078164809     
   7.61105906152616        7.37522796870181     
  -33.0257047662808       -32.8863226558601       -32.6736312748469     
  -32.4095040878049       -32.0333131657369       -31.6097657795665     
  -31.2517706943350       -31.2113298823899     
 -2.822002763955239E-003  0.000000000000000E+000
  0.992075883456645       0.000000000000000E+000
  0.995189379419445       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
